/*
 Navicat Premium Data Transfer

 Source Server         : 阿里云
 Source Server Type    : MySQL
 Source Server Version : 50726
 Source Host           : 114.55.33.198:3306
 Source Schema         : wumei-smart

 Target Server Type    : MySQL
 Target Server Version : 50726
 File Encoding         : 65001

 Date: 15/04/2022 23:32:21
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for iot_things_model_template
-- ----------------------------
DROP TABLE IF EXISTS `iot_things_model_template`;
CREATE TABLE `iot_things_model_template`  (
  `template_id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '物模型ID',
  `template_name` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '物模型名称',
  `tenant_id` bigint(20) NOT NULL COMMENT '租户ID',
  `tenant_name` varchar(30) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT '' COMMENT '租户名称',
  `identifier` varchar(32) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '标识符，产品下唯一',
  `type` tinyint(1) NOT NULL COMMENT '模型类别（1-属性，2-功能，3-事件）',
  `datatype` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '数据类型（integer、decimal、string、bool、array、enum）',
  `specs` json NOT NULL COMMENT '数据定义',
  `is_sys` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否系统通用（0-否，1-是）',
  `is_Top` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否首页显示（0-否，1-是）',
  `is_Monitor` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否实时监测（0-否，1-是）',
  `del_flag` char(1) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '0' COMMENT '删除标志（0代表存在 2代表删除）',
  `create_by` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT '创建者',
  `create_time` datetime(0) NULL DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT '更新者',
  `update_time` datetime(0) NULL DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`template_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 16 CHARACTER SET = utf8 COLLATE = utf8_general_ci COMMENT = '物模型模板' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of iot_things_model_template
-- ----------------------------
INSERT INTO `iot_things_model_template` VALUES (1, '空气温度', 1, 'admin', 'temperature', 1, 'decimal', '{\"max\": 120, \"min\": -20, \"step\": 0.1, \"type\": \"decimal\", \"unit\": \"℃\"}', 1, 1, 1, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-09 20:58:06', NULL);
INSERT INTO `iot_things_model_template` VALUES (2, '空气湿度', 1, 'admin', 'humidity', 1, 'decimal', '{\"max\": 100, \"min\": 0, \"step\": 0.1, \"type\": \"decimal\", \"unit\": \"%\"}', 1, 1, 1, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-11 00:11:08', NULL);
INSERT INTO `iot_things_model_template` VALUES (3, '二氧化碳', 1, 'admin', 'co2', 1, 'integer', '{\"max\": 6000, \"min\": 100, \"step\": 1, \"type\": \"integer\", \"unit\": \"ppm\"}', 1, 0, 1, '0', 'admin', '2022-03-09 17:41:49', '', '2022-04-12 16:06:23', NULL);
INSERT INTO `iot_things_model_template` VALUES (4, '室内亮度', 1, 'admin', 'brightness', 1, 'integer', '{\"max\": 10000, \"min\": 0, \"step\": 1, \"type\": \"integer\", \"unit\": \"cd/m2\"}', 1, 0, 1, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-11 00:10:17', NULL);
INSERT INTO `iot_things_model_template` VALUES (5, '设备开关', 1, 'admin', 'switch', 2, 'bool', '{\"type\": \"bool\", \"trueText\": \"打开\", \"falseText\": \"关闭\"}', 1, 1, 0, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-09 17:41:49', NULL);
INSERT INTO `iot_things_model_template` VALUES (6, '运行档位', 1, 'admin', 'gear', 2, 'enum', '{\"type\": \"enum\", \"enumList\": [{\"text\": \"低速档位\", \"value\": \"0\"}, {\"text\": \"中速档位\", \"value\": \"1\"}, {\"text\": \"中高速档位\", \"value\": \"2\"}, {\"text\": \"高速档位\", \"value\": \"3\"}]}', 1, 1, 0, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-09 17:41:49', NULL);
INSERT INTO `iot_things_model_template` VALUES (7, '灯光颜色', 1, 'admin', 'light_color', 2, 'array', '{\"type\": \"array\", \"arrayType\": \"int\"}', 1, 0, 0, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-11 00:54:11', NULL);
INSERT INTO `iot_things_model_template` VALUES (8, '屏显消息', 1, 'admin', 'message', 2, 'string', '{\"type\": \"string\", \"maxLength\": 1024}', 1, 0, 0, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-09 17:41:49', NULL);
INSERT INTO `iot_things_model_template` VALUES (9, '上报监测数据', 1, 'admin', 'report_monitor', 2, 'integer', '{\"max\": 10, \"min\": 1, \"step\": 1, \"type\": \"integer\", \"unit\": \"次数\"}', 1, 0, 0, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-09 17:41:49', NULL);
INSERT INTO `iot_things_model_template` VALUES (10, '环境温度过高', 1, 'admin', 'height_temperature', 3, 'decimal', '{\"max\": 100, \"min\": 0, \"step\": 0.1, \"type\": \"decimal\", \"unit\": \"℃\"}', 1, 0, 0, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-11 14:48:21', NULL);
INSERT INTO `iot_things_model_template` VALUES (11, '设备发生异常', 1, 'admin', 'exception', 3, 'string', '{\"type\": \"string\", \"maxLength\": 1024}', 1, 0, 0, '0', 'admin', '2022-03-09 17:41:49', '', '2022-03-09 17:41:49', NULL);
INSERT INTO `iot_things_model_template` VALUES (15, '管理员测试通用物', 1, 'admin', '1111111', 1, 'integer', '{\"max\": 1111, \"min\": 11, \"step\": null, \"type\": \"integer\"}', 1, 0, 0, '0', 'admin', '2022-04-15 23:30:23', '', NULL, NULL);

SET FOREIGN_KEY_CHECKS = 1;
